\hypertarget{structi__StreamReader}{
\section{i\_\-StreamReader Struct Reference}
\label{structi__StreamReader}\index{i\_\-StreamReader@{i\_\-StreamReader}}
}


{\ttfamily \#include $<$stream\_\-reader.h$>$}



Collaboration diagram for i\_\-StreamReader:
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
struct \hyperlink{structinterface}{interface} $\ast$const \hyperlink{structi__StreamReader_ac1a75d5e8f7932c13f1575805f097a4a}{\_\-}
\item 
\hyperlink{stream__reader_8h_a658a56ce1aa463cc7de51f42080ca24f}{fptr\_\-streamReaderRead} \hyperlink{structi__StreamReader_ae27c6977fb19bd1199316d8724b1c693}{read}
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 10 of file stream\_\-reader.h.



\subsection{Member Data Documentation}
\hypertarget{structi__StreamReader_ac1a75d5e8f7932c13f1575805f097a4a}{
\index{i\_\-StreamReader@{i\_\-StreamReader}!\_\-@{\_\-}}
\index{\_\-@{\_\-}!i_StreamReader@{i\_\-StreamReader}}
\subsubsection[{\_\-}]{\setlength{\rightskip}{0pt plus 5cm}struct {\bf interface}$\ast$ const {\bf i\_\-StreamReader::\_\-}}}
\label{structi__StreamReader_ac1a75d5e8f7932c13f1575805f097a4a}


Definition at line 11 of file stream\_\-reader.h.

\hypertarget{structi__StreamReader_ae27c6977fb19bd1199316d8724b1c693}{
\index{i\_\-StreamReader@{i\_\-StreamReader}!read@{read}}
\index{read@{read}!i_StreamReader@{i\_\-StreamReader}}
\subsubsection[{read}]{\setlength{\rightskip}{0pt plus 5cm}{\bf fptr\_\-streamReaderRead} {\bf i\_\-StreamReader::read}}}
\label{structi__StreamReader_ae27c6977fb19bd1199316d8724b1c693}


Definition at line 12 of file stream\_\-reader.h.



The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
include/interface/\hyperlink{stream__reader_8h}{stream\_\-reader.h}\end{DoxyCompactItemize}
